From 915f086db114e1c3d24aaa7e65e427bd7e27bdec Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Thu, 25 Mar 2021 18:39:35 -0500
Subject: assembly instructions skeleton

---
 documentation/documentation.tex | 145 ----------------------------------------
 1 file changed, 145 deletions(-)
 delete mode 100644 documentation/documentation.tex

(limited to 'documentation/documentation.tex')

diff --git a/documentation/documentation.tex b/documentation/documentation.tex
deleted file mode 100644
index 2172f9d..0000000
--- a/documentation/documentation.tex
+++ /dev/null
@@ -1,145 +0,0 @@
-% document
-\documentclass[11pt]{article}
-\usepackage[letterpaper, portrait, margin=0.75in]{geometry}
-\usepackage{setspace}
-\usepackage{color}
-
-% text
-\usepackage[utf8]{inputenc}
-\setlength\parindent{0pt}
-\setlength{\parskip}{1em}
-\usepackage{enumitem}
-\renewcommand{\familydefault}{\sfdefault}
-\newcommand{\RomanNumeral}[1]{\textrm{\uppercase\expandafter{\romannumeral #1\relax}}}
-
-% math
-\usepackage{amssymb}
-\usepackage{amsmath}
-\usepackage[cm]{sfmath}
-\usepackage{commath}
-\usepackage{multirow}
-\DeclareMathAlphabet{\mathpzc}{OT1}{pzc}{m}{it}
-
-% graphics
-\usepackage{graphics}
-\usepackage{graphicx}
-\usepackage{epsfig}
-\usepackage{epstopdf}
-\usepackage{xpatch}
-\usepackage{pdfpages}
-
-% "S" prefix
-\renewcommand{\theequation}{S\arabic{equation}}
-\renewcommand{\thefigure}{S\arabic{figure}}
-\renewcommand{\thetable}{S\arabic{table}}
-
-% each section begins new page
-\let\stdsection\section
-\renewcommand\section{\clearpage\stdsection}
-
-% hyperref
-\usepackage{hyperref}
-\hypersetup{
-	colorlinks,
-	bookmarksopen,
-	bookmarksnumbered,
-	hidelinks,
-}
-\usepackage[all]{hypcap}  % helps hyperref work properly
-
-% bibliography
-\usepackage[numbers]{natbib}
-
-\begin{document}
-\setcounter{page}{1}
-\renewcommand{\thepage}{S\arabic{page}}
-
-\begin{center}
-	\LARGE
-
-        Supporting Information
-
-        Open Source Photoreactor
-
-	\normalsize
-
-	\textit{Philip Lampkin, Blaise J. Thompson, and Samuel H. Gellman*}
-
-	Department of Chemistry, University of Wisconsin--Madison\\
-	1101 University Ave., Madison, Wisconsin 53706
-\end{center}
-
-\vspace{\fill}
-
-*Corresponding Author \\
-\hspace*{2ex} email: gellman@chem.wisc.edu \\
-
-\pagebreak
-\renewcommand{\baselinestretch}{0.75}\normalsize
-\tableofcontents
-\renewcommand{\baselinestretch}{1.0}\normalsize
-\pagebreak
-
-\section{Introduction}
-
-\section{Electronics}
-
-\subsection{Analog}
-
-\includepdf[landscape=true]{"../analog-driver/driver.pdf"}
-
-\subsection{Digital}
-
-TODO: document I2C connection choice.
-Consistent with Adafruit, Sparkfun, Seeed...
-
-\subsubsection{Driver}
-
-\includepdf[landscape=true]{"../digital-driver/driver.pdf"}
-
-\subsubsection{Controller}
-
-\clearpage
-\section{Mechanical Construction}
-
-0.5'' standoff: RAF 4505-440-AL
-
-\subsection{Base}
-
-\subsubsection{LED and Heatsink}
-
-TODO: LED PCB part number
-
-TODO: heatsink part number
-
-\begin{figure}
-  \centering
-  \includegraphics[width=\textwidth/2]{"../pictures/tap-heatsink.jpg"}
-  \caption{Two of the innermost holes on the extruded heatsink must be 4-40 tapped.}
-\end{figure}
-
-Tap the heatsink.
-We used thread-forming tap: OSG 1400105300.
-
-TODO: heatsink compoud
-
-Install with wires facing towards printed hole
-
-Use 4-40 1/4''.
-
-\subsubsection{Fan}
-
-TODO: fan part number
-
-Noctua NF-A12x15 PWM
-
-pins:
-blue: PWM (5 V)
-yellow: +12 V
-black: ground
-
-Use 4-40 3/4'' into captured nuts
-
-\section{Efficacy}
-
-\end{document}
-- 
cgit v1.2.3

