From a5c9eabed7d7e49cf8c7d07d22ae28b92dead2aa Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Tue, 23 Jul 2024 16:22:17 -0500
Subject: instrumentation lab director

---
 public/ThompsonBlaiseCV.tex | 18 ++++++++++--------
 1 file changed, 10 insertions(+), 8 deletions(-)

(limited to 'public/ThompsonBlaiseCV.tex')

diff --git a/public/ThompsonBlaiseCV.tex b/public/ThompsonBlaiseCV.tex
index 57e706c..a4fedc8 100644
--- a/public/ThompsonBlaiseCV.tex
+++ b/public/ThompsonBlaiseCV.tex
@@ -23,15 +23,17 @@
 \end{rSection}
 
 \begin{rSection}{Experience}
-  \begin{rSubsection}{Instrumentation Scientist}{2018 - Present}
+  \begin{rSubsection}{Instrumentation Lab Director}{2024 - Present}
     {UW-Madison Chemistry}{Madison WI}
-    \item Manage an instrumental ``makerspace'' for the Chemistry department.
-    \item Create custom scientific instrumentation for researchers and educators.
-    \item Serve as a mentor to students undertaking instrumental design projects.
-    \item Maintain an inventory of over 1000 electronic components.
-    \item Manage multiple student workers assisting with shop jobs and upkeep.
-    \item Contribute to open-source software for instrumentation control.
-    \item Participate in writing, submitting, and reviewing scientific papers.
+    \item Teach several graduate-level courses: instrumental, electrochemistry, separations, electronics.
+    \item Design and publish lab exercises and instrumentation.
+  \end{rSubsection}
+  \begin{rSubsection}{Instrumentation Scientist}{2018 - 2024}
+    {UW-Madison Chemistry}{Madison WI}
+    \item Created custom scientific instrumentation for researchers and educators.
+    \item Served as a mentor to students undertaking instrumental design projects.
+    \item Contributed to open-source software for instrumentation control.
+    \item Participated in writing, submitting, and reviewing scientific papers.
   \end{rSubsection}
   \begin{rSubsection}{Graduate Research Assistant}{2011 - 2018}
     {John C. Wright Group - ultrafast materials spectroscopy}{Madison WI}
-- 
cgit v1.2.3

