From 46eb6bad8700abdfef52fd83445607228016b10b Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Sat, 24 Mar 2018 16:45:13 -0500
Subject: 2018-03-24 16:45

---
 PEDOT:PSS/chapter.tex | 40 ++++++++++++++++++++--------------------
 1 file changed, 20 insertions(+), 20 deletions(-)

(limited to 'PEDOT:PSS/chapter.tex')

diff --git a/PEDOT:PSS/chapter.tex b/PEDOT:PSS/chapter.tex
index 8bb1510..1e26434 100644
--- a/PEDOT:PSS/chapter.tex
+++ b/PEDOT:PSS/chapter.tex
@@ -71,7 +71,7 @@ processing.  %
 thin film used in this work.  %
 
 \clearpage
-\begin{dfigure}
+\begin{figure}
   \centering
 	\includegraphics[width=0.5\linewidth]{"PEDOT:PSS/linear"}
 	\caption[PEDOT:PSS transmission and reflectance spectra.]{
@@ -80,7 +80,7 @@ thin film used in this work.  %
     Extinction is $\log_{10}{\mathsf{(transmission)}}$.  %
   }
 	\label{fig:PEDOTPSS_linear}
-\end{dfigure}
+\end{figure}
 \clearpage
 
 \section{Three-pulse echo spectroscopy}  % --------------------------------------------------------
@@ -98,7 +98,7 @@ that all three excitation pulse powers were equal within measurement error.  %
 
 \autoref{fig:PEDOTPSS_mask} diagrams the phase matching mask used in this set of experiments.  %
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=0.5\linewidth]{"PEDOT:PSS/mask"}
 	\caption[PEDOT:PSS 3PE phase matching mask.]{
     Phase matching mask used in this experiment.
@@ -107,19 +107,19 @@ that all three excitation pulse powers were equal within measurement error.  %
     The two stars mark the two output poyntings detected in this work.
   }
 	\label{fig:PEDOTPSS_mask}
-\end{dfigure}
+\end{figure}
 
 \autoref{fig:PEDOTPSS_raw} shows the ten raw 2D delay-delay scans that comprise the primary dataset
 described in this section.  %
 The rows correspond to the two phase matching conditions, as labeled.  %
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/raw"}
 	\caption[PEDOT:PSS 3PE raw data.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_raw}
-\end{dfigure}
+\end{figure}
 
 \subsection{Assignment of zero delay}  % ----------------------------------------------------------
 
@@ -161,37 +161,37 @@ These pulse-overlap effects cause the 3PEPS at small $T$ even without inhomogene
 [CITE]  %
 At long $T$, the average static 3PEPS is 2.5 fs.  %
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/delay space"}
 	\caption[PEDOT:PSS 3PE delay space.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_delay_space}
-\end{dfigure}
+\end{figure}
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/processed"}
 	\caption[PEDOT:PSS 3PE processed data.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_processed}
-\end{dfigure}
+\end{figure}
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/overtraces"}
 	\caption[PEDOT:PSS 3PE traces.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_overtraces}
-\end{dfigure}
+\end{figure}
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/traces"}
 	\caption[PEDOT:PSS 3PE traces.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_traces}
-\end{dfigure}
+\end{figure}
 
 There is a deviation of the TO \RomanNumeral{1}-\RomanNumeral{3} 3PEPS* trace (green line) from the
 other traces.  %
@@ -238,13 +238,13 @@ Taken together, it is clear that both pure dephasing and ensemble dephasing infl
 shift so it is important to find valuse of $T_2^*$ and $\Delta_{\mathsf{inhom}}$ that uniquely
 constrain the measured response.  %
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/parametric"}
 	\caption[PEDOT:PSS 3PE traces.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_parametric}
-\end{dfigure}
+\end{figure}
 
 We simulated the $\tau$ trance for a variety of $\Delta_{\mathsf{inhom}}$ and $T_2$ values.  %
 The results for $\Delta_t = 40$ fs are summarized in \autoref{fig:PEDOTPSS_parametric}.  %
@@ -264,7 +264,7 @@ fs.  %
 Clearly, there is no upper limit that can provide an upper limit for the inhomogeneous
 broadening.  %
 
-\begin{dtable}
+\begin{table}
  \begin{tabular}{ c | c c c }
   $\Delta_t$ (fs) & $T_2$ (fs) & $\hbar T_2^{-1}$ (meV) & $\Delta_{\mathsf{inhom}}$ (meV) \\ \hline
   45 & --- & --- & --- \\
@@ -274,15 +274,15 @@ broadening.  %
    CAPTION TODO
  }
  \label{tab:PEDOTPSS_table}
-\end{dtable}
+\end{table}
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\linewidth]{"PEDOT:PSS/agreement"}
 	\caption[PEDOT:PSS 3PE traces.]{
     CAPTION TODO
   }
 	\label{fig:PEDOTPSS_agreement}
-\end{dfigure}
+\end{figure}
 
 Our model system does ans excellent job of reproducing the entire 2D transient within measurement
 error (\autoref{fig:PEDOTPSS_agreement}).  %
-- 
cgit v1.2.3

