From 4c38970579d9bd994b18f10ab9fd3956beff4929 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Sat, 14 Apr 2018 22:36:49 -0500
Subject: 2018-04-14 22:36

---
 PbSe_susceptibility/chapter.tex | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'PbSe_susceptibility/chapter.tex')

diff --git a/PbSe_susceptibility/chapter.tex b/PbSe_susceptibility/chapter.tex
index 8bacebf..c28b300 100644
--- a/PbSe_susceptibility/chapter.tex
+++ b/PbSe_susceptibility/chapter.tex
@@ -664,7 +664,8 @@ Our method gives agreement with the $\phi=0.25$ bleach factor.  %
 		$ |B| / |\gamma_\text{sol}| $ & $1.3 \cdot 10^5$ & $1.6 \cdot 10^5$ & 1.3 \\
 		$ |\gamma_{\nu1}| / |\gamma_\text{sol}| $ & $0.25 \pm 0.04 $ & $5.1$ & 20.4 \\
 	\end{tabular}
-  \caption{Non-linear parameters relative to CCl$_4$ hyperpolarizability.  $\gamma_{\nu 1}$:
+  \caption[Non-linear parameters relative to carbon tetrachloride hyperpolarizability.]{
+    Non-linear parameters relative to CCl$_4$ hyperpolarizability.  $\gamma_{\nu 1}$:
     hyperpolarizability of the $\nu_1$ Raman transition.}
 	\label{pss:tab:gamma_ratio}
 \end{table}
@@ -683,7 +684,8 @@ Our method gives agreement with the $\phi=0.25$ bleach factor.  %
 		& 4 & 7 & 120 \\
 		$\phi$ (\autoref{pss:eq:gamma_to_phi}) & 0.3 & 0.6 & 0.15 \\
 	\end{tabular}
-  \caption{Comparison of these measurements with PbX measurements in literature.
+  \caption[Comparison with PbX literature measurements.]{
+    Comparison of these measurements with PbX measurements in literature.
     $\gamma_\text{raman}^{(3)}$ refers to the 465 $\text{cm}^{-1}$ (symmetric stretch) mode of
     $\text{CCl}_4$}
 	\label{pss:tab:litcompare}
-- 
cgit v1.2.3

