From dc15adadcb2b7560d982c3aee0ef319b50d9d362 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Wed, 4 Apr 2018 11:06:13 -0500
Subject: remove gls

---
 acquisition/chapter.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'acquisition/chapter.tex')

diff --git a/acquisition/chapter.tex b/acquisition/chapter.tex
index fe3c4da..0d3d1c5 100644
--- a/acquisition/chapter.tex
+++ b/acquisition/chapter.tex
@@ -65,7 +65,7 @@ It is open source, developed on GitHub.  % TODO: cite PyCMDS on github
 PyCMDS is used to drive both of the MR-CMDS instruments maintained by the Wright Group: the ``fs
 table'', focused on semiconductor photophysics, and the ``ps table'', focused on molecular
 systems.  %
-In the Wright Group, \gls{PyCMDS} replaces the old acquisition softwares `ps control', ritten by
+In the Wright Group, PyCMDS replaces the old acquisition softwares `ps control', ritten by
 Kent Meyer and `Control for Lots of Research in Spectroscopy' written by Schuyler Kain.
 
 When PyCMDS starts up, the GUI is constructed out of modules depending on which hardware and
@@ -659,10 +659,10 @@ central conceit of PyCMDS.  %
 \subsection{Ideal Axis Positions} \label{acq:sec:ideal_axis_positions}  % -------------------------
 
 Frequency domain multidimensional spectroscopy is a time-intensive process.  %
-A typical \gls{pixel} takes between one-half second and three seconds to acquire.  %
+A typical pixel takes between one-half second and three seconds to acquire.  %
 Depending on the exact hardware being scanned and signal being detected, this time may be mostly
 due to hardware motion or signal collection.  %
-Due to the \gls{curse of dimensionality}, a typical three-dimensional CMDS experiment contains
+Due to the curse of dimensionality, a typical three-dimensional CMDS experiment contains
 roughly 100,000 pixels.  %
 CMDS hardware is transiently-reliable, so speeding up experiments is a crucial component of
 unlocking ever larger dimensionalities and higher resolutions.  %
-- 
cgit v1.2.3

