From 357568e1fb77afed9dfa203e62da237bf7ce51b3 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Mon, 9 Apr 2018 00:24:18 -0500
Subject: 2018-04-09 00:24

---
 active_correction/chapter.tex | 35 +++++++++++++++++++++++++++++------
 1 file changed, 29 insertions(+), 6 deletions(-)

(limited to 'active_correction/chapter.tex')

diff --git a/active_correction/chapter.tex b/active_correction/chapter.tex
index e40ff9d..d7b6a4e 100644
--- a/active_correction/chapter.tex
+++ b/active_correction/chapter.tex
@@ -34,12 +34,35 @@ Some of these strategies have already been implemented, others are partially imp
 others are still just ideas.  %
 I hope to show that active correction is a particularly useful strategy in MR-CMDS.  %
 
+[SPECTRAL DELAY PARAGRAPH]
+
+[POYNTING CORRECTION PARAGRAPH]
+
+[EXCITATION POWER CORRECTION PARAGRAPH]
+
+[CHOPPING PARAGRAPH]
+
+[FIBRILLATION]
+
 \section{Spectral delay correction}  % ============================================================
 
+\begin{figure}
+  \caption[CAPTION TODO]{
+    CAPTION TODO: SPECTRAL DELAY CORRECTION FIGURE
+  }
+\end{figure}
+
 \section{Poynting correction}  % ==================================================================
 
+\begin{figure}
+  \caption[CAPTION TODO]{
+    CAPTION TODO: POYNTING CORRECTION FIGURE
+  }
+\end{figure}
+
 \section{Excitation power correction}  % ==========================================================
 
+\clearpage
 \section{Chopping}  % =============================================================================
 
 \subsection{Scatter}  % ---------------------------------------------------------------------------
@@ -225,12 +248,6 @@ number of laser shots.  %
 Taking twice as many laser shots when dual chopping brings the signal to noise to at least as good
 as the original single chopping.  %
 
-Fibrillation is the intentional randomization of excitation phase during an experiment.  %
-Because the interference term depends on the phase of the excitation field relative to the signal,
-averaging over many shots with random phase will cause the interference term to approach zero.  %
-This is a well known strategy for removing unwanted interference terms \cite{SpectorIvanC2015a,
-  McClainBrianL2004a}.  %
-
 \subsection{Normalization of dual-chopped self-heterodyned signal}
 
 %\begin{table}[!htb]
@@ -280,4 +297,10 @@ Now, substituting in BRAZARD formalism:
 
 \section{Fibrillation}  % =========================================================================
 
+Fibrillation is the intentional randomization of excitation phase during an experiment.  %
+Because the interference term depends on the phase of the excitation field relative to the signal,
+averaging over many shots with random phase will cause the interference term to approach zero.  %
+This is a well known strategy for removing unwanted interference terms \cite{SpectorIvanC2015a,
+  McClainBrianL2004a}.  %
+
 \section{Conclusions}  % ==========================================================================
\ No newline at end of file
-- 
cgit v1.2.3

