From a9a7523ac476cbfcab77078c3379f9238cd27820 Mon Sep 17 00:00:00 2001
From: ksunden <sunden@wisc.edu>
Date: Mon, 9 Apr 2018 20:55:45 -0500
Subject: Caption for Poynting Correction

---
 active_correction/chapter.tex | 15 ++++++++++++---
 1 file changed, 12 insertions(+), 3 deletions(-)

(limited to 'active_correction/chapter.tex')

diff --git a/active_correction/chapter.tex b/active_correction/chapter.tex
index 30919cd..33566eb 100644
--- a/active_correction/chapter.tex
+++ b/active_correction/chapter.tex
@@ -116,8 +116,17 @@ controlled by delay stages, although the idea has not yet been realized in pract
 [CONTENT FROM KYLE SUNDEN]
 
 \begin{figure}
-  \caption[CAPTION TODO]{
-    CAPTION TODO: POYNTING CORRECTION FIGURE
+	\includegraphics[width=0.45\textwidth]{"active_correction/poynting correction/intensity.png"}
+  \caption[Poynting Correction curve generation.]{
+    A typical example of the output of the Poynting Tune module.
+    The top figure shows the curve for the axis designated Theta.
+    The thin, solid line is the previous curve, the thick transparent line is the new tuning curve.
+    The y-axis is in units of motor steps, the x-axis is in units of wavenumbers.
+    The bottom plot shows the intensity of signal measured for the change in Theta vs. setpoint.
+    Center of mass of each vertical slice are extracted and linearly interpolated to obtain the new
+    calibration curve.
+    This figure was automatically generated by PyCMDS on March 28, 2018 using an OPA-800 generating
+    1 ps infrared light.
   }
 \end{figure}
 
@@ -364,4 +373,4 @@ averaging over many shots with random phase will cause the interference term to
 This is a well known strategy for removing unwanted interference terms \cite{SpectorIvanC2015a,
   McClainBrianL2004a}.  %
 
-\section{Conclusions}  % ==========================================================================
\ No newline at end of file
+\section{Conclusions}  % ==========================================================================
-- 
cgit v1.2.3

