From dc15adadcb2b7560d982c3aee0ef319b50d9d362 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Wed, 4 Apr 2018 11:06:13 -0500
Subject: remove gls

---
 active_correction/chapter.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'active_correction/chapter.tex')

diff --git a/active_correction/chapter.tex b/active_correction/chapter.tex
index 40e0e56..76ae49d 100644
--- a/active_correction/chapter.tex
+++ b/active_correction/chapter.tex
@@ -101,7 +101,7 @@ The phase of signal is then
 The phase of each excitation field can also be written:
 \begin{eqnarray}
 \Phi_{1} &=& \mathrm{e}^0 \\
-\Phi_{2} &=& \mathrm{e}^{-\tau_2\gls{omega}} \\
+\Phi_{2} &=& \mathrm{e}^{-\tau_2\omega} \\
 \Phi_{2^\prime} &=& \mathrm{e}^{-\tau_{2^\prime}\omega}
 \end{eqnarray}
 The cross term between scatter and signal is the product of $\Phi_\mathrm{sig}$ and $\Phi_\mathrm{scatter}$. The cross terms are:
-- 
cgit v1.2.3

