From 4c38970579d9bd994b18f10ab9fd3956beff4929 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Sat, 14 Apr 2018 22:36:49 -0500
Subject: 2018-04-14 22:36

---
 errata/chapter.tex | 25 -------------------------
 1 file changed, 25 deletions(-)
 delete mode 100644 errata/chapter.tex

(limited to 'errata/chapter.tex')

diff --git a/errata/chapter.tex b/errata/chapter.tex
deleted file mode 100644
index 159c713..0000000
--- a/errata/chapter.tex
+++ /dev/null
@@ -1,25 +0,0 @@
-\chapter{Errata}
-
-In this appendix I list the errors I am currently aware of in my publications and associated
-work.  %
-
-\section{Czech 2015}  % ---------------------------------------------------------------------------
-
-The following is an errata for \textcite{CzechKyleJonathan2015a}, published in November 2015.
-
-\begin{itemize}
-  \item Reference 13 is identical to reference 9.
-  \item In the last paragraph of the introduction the sentence ``The experimental spectra differ
-    from the simple 2D spectrum shown in Figure 1d and those of earlier CMDS experiments with model
-    systems'' appears. This sentence cites references 6 through 10. Instead, it should cite
-    references 15 through 20.
-  \item In the last paragraph begining on page 12148, the text ``Automated delay stages and neutral
-    density filters set the excitation time delays over all values of $\tau_{21}$ with
-    $\tau_{22}=0$''    appears. For the second $\tau$, the subscript should read $22^\prime$, not
-    $22$.
-  \item Caption of Figure 5 reads, in part: "showing the impact of the $\omega_1$ excitation
-    frequency on the $\omega_1$ spectral line shape". This should instead read "showing the impact
-    of the $\omega_1$ excitation frequency on the $\omega_2$ spectral line shape". The subscript on
-    the last $\omega$ should be a 2 and not a 1.
-  \item Figure 6 e$^\prime$+e,e$^\prime$ should read e$^\prime$+e,e and vice versa.
-\end{itemize}
\ No newline at end of file
-- 
cgit v1.2.3

