From 7a15287015fb33da2050ea2d75969a8c8ff3c49c Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Mon, 12 Mar 2018 10:42:25 -0500
Subject: 2018-03-12 10:42

---
 opa/chapter.tex | 16 ++++++++++++----
 1 file changed, 12 insertions(+), 4 deletions(-)

(limited to 'opa/chapter.tex')

diff --git a/opa/chapter.tex b/opa/chapter.tex
index a83eac5..b92f62a 100644
--- a/opa/chapter.tex
+++ b/opa/chapter.tex
@@ -1,9 +1,17 @@
 \chapter{A robust, fully automated algorithm to collect high quality OPA tuning curves}
 
-\textit{Principle design features of the new EVV 2DIR optical delivery system include the
-  following: ... Pairs of motorized gimbal mount mirrors on each OPA to compensate beam pointing
-  changes ... Automated calibration of OPAs, delay stages and motorized mounts.
-  ---\textcite{DonaldsonPaulMurray2007a}}  % page 313
+\begin{dquote}
+  Principle design features of the new EVV 2DIR optical delivery system include the following:
+  \begin{ditemize}
+    \item Pairs of motorized gimbal mount mirrors on each OPA to compensate beam pointing changes.
+    \item Automated calibration of OPAs, delay stages and motorized mounts.
+  \end{ditemize}
+      
+  \dsignature{Paul Donaldson, ``Improving ... EVV 2DIR Spectroscopy'' (2007)
+    \cite{DonaldsonPaulMurray2007a}}  % appears on page 313
+\end{dquote}
+
+\clearpage
 
 This chapter pasted from publication...
 
-- 
cgit v1.2.3

