From 0a8296b1e94022e20e1094596244156a75a8d65b Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Tue, 24 Apr 2018 09:01:12 -0500
Subject: 2018-04-24 09:01

---
 presentation.tex | 70 ++++++++++++++++++++++++++++----------------------------
 1 file changed, 35 insertions(+), 35 deletions(-)

(limited to 'presentation.tex')

diff --git a/presentation.tex b/presentation.tex
index 57a4094..9d0e3b9 100644
--- a/presentation.tex
+++ b/presentation.tex
@@ -73,15 +73,15 @@
     \item quality
     \item diversity
   \end{itemize}
-  \vphantom{M} \\
-  Unlock the true potential of these instruments:
-  \begin{itemize}
-    \item automated calibration
-    \item 2D, 3D, 4D...
-    \item full diversity of possible hardware combinations, rapid development
-    \item powerful and flexible detection strategies
-    \item data processing tools
-  \end{itemize}
+%   \vphantom{M} \\
+%   Unlock the true potential of these instruments:
+%   \begin{itemize}
+%     \item automated calibration
+%     \item 2D, 3D, 4D...
+%     \item full diversity of possible hardware combinations, rapid development
+%     \item powerful and flexible detection strategies
+%     \item data processing tools
+%   \end{itemize}
 \end{frame}
 
 \section{Tunability}  % ===========================================================================
@@ -92,31 +92,6 @@
   Optical Parametric Amplifiers
 \end{frame}
 
-\begin{frame}{Two strategies for CMDS}
-  Two strategies for collecting multidimensional spectra:
-  \vspace{\baselineskip} \\
-  \begin{columns}
-    \begin{column}{0.4\textwidth}
-      Time Domain
-      \begin{itemize}
-        \item broadband pulses
-        \item resolve spectra interferometrically
-        \item fast (even single shot)
-        \item robust
-      \end{itemize} 
-    \end{column}
-    \begin{column}{0.4\textwidth}
-      Frequency Domain
-      \begin{itemize}
-        \item narrowband pulses
-        \item resolve spectra by tuning OPAs directly
-        \item slow (lots of motor motion)
-        \item fragile
-      \end{itemize}
-    \end{column}
-  \end{columns}
-\end{frame}
-
 \begin{frame}{Two strategies for CMDS}
   \begin{columns}
     \begin{column}{0.5\textwidth}
@@ -358,7 +333,7 @@
 \begin{frame}{Integrations}
   \begin{columns}
     \begin{column}{0.6\textwidth}
-      \adjincludegraphics[width=\textwidth]{PbSe_global_analysis/movies_fitted}
+      \adjincludegraphics[width=\textwidth]{PEDOT_PSS/agreement}
     \end{column}
     \begin{column}{0.4\textwidth}
       \begin{itemize}
@@ -438,6 +413,31 @@
   Two ``stages'', each with two motorized optics.
 \end{frame}
 
+\begin{frame}{Two strategies for CMDS}
+  Two strategies for collecting multidimensional spectra:
+  \vspace{\baselineskip} \\
+  \begin{columns}
+    \begin{column}{0.4\textwidth}
+      Time Domain
+      \begin{itemize}
+        \item broadband pulses
+        \item resolve spectra interferometrically
+        \item fast (even single shot)
+        \item robust
+      \end{itemize} 
+    \end{column}
+    \begin{column}{0.4\textwidth}
+      Frequency Domain
+      \begin{itemize}
+        \item narrowband pulses
+        \item resolve spectra by tuning OPAs directly
+        \item slow (lots of motor motion)
+        \item fragile
+      \end{itemize}
+    \end{column}
+  \end{columns}
+\end{frame}
+
 \begin{frame}{Tuning}
   % TODO: curve plot?
   Tuning curves---recorded correspondence between motor positions and output color.
-- 
cgit v1.2.3

