From 46eb6bad8700abdfef52fd83445607228016b10b Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Sat, 24 Mar 2018 16:45:13 -0500
Subject: 2018-03-24 16:45

---
 spectroscopy/chapter.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'spectroscopy/chapter.tex')

diff --git a/spectroscopy/chapter.tex b/spectroscopy/chapter.tex
index a301117..fe10f60 100644
--- a/spectroscopy/chapter.tex
+++ b/spectroscopy/chapter.tex
@@ -176,11 +176,11 @@ Transient absorbance (TA) spectroscopy is a self-heterodyned technique.  %
 Through chopping you can measure nonlinearities quantitatively much easier than with homodyne
 detected (or explicitly heterodyned) experiments.
 
-\begin{dfigure}
+\begin{figure}
 	\includegraphics[width=\textwidth]{"spectroscopy/TA setup"}
 	\label{fig:ta_and_tr_setup}
 	\caption{CAPTION TODO}
-\end{dfigure}
+\end{figure}
 
 \autoref{fig:ta_and_tr_setup} diagrams the TA measurement for a generic sample.  %
 Here I show measurement of both the reflected and transmitted probe beam \dots not important in
-- 
cgit v1.2.3

