From cd162fef9d9f3145c1e29c63439759636ba62c41 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Mon, 26 Feb 2018 17:08:07 -0600
Subject: 2018-02-26 17:07

---
 spectroscopy/chapter.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'spectroscopy/chapter.tex')

diff --git a/spectroscopy/chapter.tex b/spectroscopy/chapter.tex
index 3aa7ffc..21a233d 100644
--- a/spectroscopy/chapter.tex
+++ b/spectroscopy/chapter.tex
@@ -162,12 +162,11 @@ Transient absorbance (TA) spectroscopy is a self-heterodyned technique.  %
 Through chopping you can measure nonlinearities quantitatively much easier than with homodyne
 detected (or explicitly heterodyned) experiments.
 
-\begin{figure}[p!]
-	\centering
+\begin{dfigure}
 	\includegraphics[width=\textwidth]{"spectroscopy/TA setup"}
 	\label{fig:ta_and_tr_setup}
 	\caption{CAPTION TODO}
-\end{figure}
+\end{dfigure}
 
 \autoref{fig:ta_and_tr_setup} diagrams the TA measurement for a generic sample.  %
 Here I show measurement of both the reflected and transmitted probe beam \dots not important in
-- 
cgit v1.2.3

