\chapter{Errata}

In this appendix I list the errors I am currently aware of in my publications and associated
work.  %

\section{Czech 2015}  % ---------------------------------------------------------------------------

The following is an errata for \textcite{CzechKyleJonathan2015a}, published in November 2015.

\begin{itemize}
  \item Reference 13 is identical to reference 9.
  \item In the last paragraph of the introduction the sentence ``The experimental spectra differ
    from the simple 2D spectrum shown in Figure 1d and those of earlier CMDS experiments with model
    systems'' appears. This sentence cites references 6 through 10. Instead, it should cite
    references 15 through 20.
  \item In the last paragraph begining on page 12148, the text ``Automated delay stages and neutral
    density filters set the excitation time delays over all values of $\tau_{21}$ with
    $\tau_{22}=0$''    appears. For the second $\tau$, the subscript should read $22^\prime$, not
    $22$.
  \item Caption of Figure 5 reads, in part: "showing the impact of the $\omega_1$ excitation
    frequency on the $\omega_1$ spectral line shape". This should instead read "showing the impact
    of the $\omega_1$ excitation frequency on the $\omega_2$ spectral line shape". The subscript on
    the last $\omega$ should be a 2 and not a 1.
  \item Figure 6 e$^\prime$+e,e$^\prime$ should read e$^\prime$+e,e and vice versa.
\end{itemize}